500490480470460450100500

DEPTH m

Ebb-to-Flood

10080604040200a 500490480470460450100500

DEPTH m

500490480470460450100500

Full Flood

100100808060604020200b 500490480470460450Distance (km)

100500

DEPTH m

500490480470460450Distance (km)

Flood-to-Ebb

1008060402020200c